-- --

IEEE P1003.2 Draft 11.2 - September 1991

Copyright � 1991 by the Institute of Electrical and Electronics Engineers, Inc. 345 East 47th Street New York, NY 10017, USA All rights reserved as an unpublished work.

This is an unapproved and unpublished IEEE Standards Draft, subject to change. The publication, distribution, or copying of this draft, as well as all derivative works based on this draft, is expressly prohibited except as set forth below.

Permission is hereby granted for IEEE Standards Committee participants to reproduce this document for purposes of IEEE standardization activities only, and subject to the restrictions contained herein.

Permission is hereby also granted for member bodies and technical committees of ISO and IEC to reproduce this document for purposes of developing a national position, subject to the restrictions contained herein.

Permission is hereby also granted to the preceding entities to make limited copies of this document in an electronic form only for the stated activities.

The following restrictions apply to reproducing or transmitting the document in any form: 1) all copies or portions thereof must identify the document’s IEEE project number and draft number, and must be accompanied by this entire notice in a prominent location; 2) no portion of this document may be redistributed in any modified or abridged form without the prior approval of the IEEE Standards Department.

Other entities seeking permission to reproduce this document, or any portion thereof, for standardization or other activities, must contact the IEEE Standards Department for the appropriate license.

Use of information contained in this unapproved draft is at your own risk.

IEEE Standards Department Copyright and Permissions 445 Hoes Lane, P.O. Box 1331 Piscataway, NJ 08855-1331, USA +1 (908) 562-3800 +1 (908) 562-1571 [FAX]

-- --

P1003.2/D11.2 INFORMATION TECHNOLOGY—POSIX 13404 4.65 true — Return true value

13405 4.65.1 Synopsis 13406 true

13407 4.65.2 Description 13408 The true utility shall return with exit code zero.

13409 4.65.3 Options 13410 None.

13411 4.65.4 Operands 13412 None.

13413 4.65.5 External Influences 13414 4.65.5.1 Standard Input 13415 None. 13416 4.65.5.2 Input Files 13417 None. 13418 4.65.5.3 Environment Variables 13419 None. 13420 4.65.5.4 Asynchronous Events 13421 Default.

13422 4.65.6 External Effects 13423 4.65.6.1 Standard Output 13424 None.

Copyright � 1991 IEEE. All rights reserved. This is an unapproved IEEE Standards Draft, subject to change.

652 4 Execution Environment Utilities

Part 2: SHELL AND UTILITIES P1003.2/D11.2 13425 4.65.6.2 Standard Error 13426 None. 13427 4.65.6.3 Output Files 13428 None.

13429 4.65.7 Extended Description 13430 None.

13431 4.65.8 Exit Status 13432 The true utility always exits with a value of zero.

13433 4.65.9 Consequences of Errors 13434 Default.

13435 4.65.10 Rationale. (This subclause is not a part of P1003.2) 13436 Examples, Usage 13437 The true utility is typically used in shell scripts. The special built-in utility : 13438 (see 3.14.2) is sometimes more efficient than true . 13439 History of Decisions Made 13440 The true utility has been retained in POSIX. 2, even though the shell special 13441 built-in : provides similar functionality, because true is widely used in existing 13442 scripts and is less cryptic to novice human script readers.

Copyright � 1991 IEEE. All rights reserved. This is an unapproved IEEE Standards Draft, subject to change.

4.65 true — Return true value 653

P1003.2/D11.2 INFORMATION TECHNOLOGY—POSIX

13443 4.66 tty — Return user’s terminal name

13444 4.66.1 Synopsis

13445 tty 13446 Obsolescent Version : 13447 tty - s

13448 4.66.2 Description 13449 The tty utility shall write to the standard output the name of the terminal that 13450 is open as standard input. The name that is used shall be equivalent to the string 13451 that would be returned by the POSIX .1 {8}ttyname () function.

13452 4.66.3 Options 13453 The tty utility shall conform to the utility argument syntax guidelines described 13454 in 2.10.2. 13455 The following option shall be supported by the implementation: 13456 - s (Obsolescent.) Do not write the terminal name. Only the exit 13457 status shall be affected by this option. The terminal status shall 13458 be determined as if the POSIX .1 {8}isatty () function were used.

13459 4.66.4 Operands 13460 None.

13461 4.66.5 External Influences

13462 4.66.5.1 Standard Input 13463 While no input is read from standard input, standard input shall be examined to 13464 determine whether or not it is a terminal, and/or to determine the name of the 13465 terminal.

13466 4.66.5.2 Input Files 13467 None.

Copyright � 1991 IEEE. All rights reserved. This is an unapproved IEEE Standards Draft, subject to change.

654 4 Execution Environment Utilities